-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.24667899002
cusum  =  0.236806204356
eta  =  0.451960638312
hl_amp_ratio  =  0.78477257144
kurtosis  =  -0.216002837597
n_points  =  336
period  =  0.344842508939
period_SNR  =  30.7589132257
period_log10FAP  =  -28.7602167171
period_uncertainty  =  3.97726938825e-05
phase_cusum  =  0.245173816246
phase_eta  =  0.928070533853
phi21  =  -3.54833960701
phi31  =  -3.77985950208
quartile31  =  0.3025
r21  =  0.0527329620009
r31  =  0.0709337824161
shapiro_w  =  0.965738773346
skewness  =  -0.460315978367
slope_per10  =  -0.0271006748639
slope_per90  =  0.0345582612459
stetson_k  =  0.754944069318
weighted_mean  =  11.9879991342
weighted_std  =  0.260336361434
