-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.37


######### Lightcurve features #########

amplitude  =  0.102176704578
cusum  =  0.142745525658
eta  =  0.64623842166
hl_amp_ratio  =  0.982709145133
kurtosis  =  -1.14854632399
n_points  =  518
period  =  0.650741834115
period_SNR  =  72.0211122815
period_log10FAP  =  -91.2233712565
period_uncertainty  =  0.000110505001381
phase_cusum  =  0.300041899486
phase_eta  =  0.213990418911
phi21  =  -2.05475533457
phi31  =  -3.06066339525
quartile31  =  0.15
r21  =  0.224136677516
r31  =  0.0776280944612
shapiro_w  =  0.938460409641
skewness  =  -0.0941021047331
slope_per10  =  -0.178020287237
slope_per90  =  0.257448843786
stetson_k  =  0.905823562738
weighted_mean  =  15.0387391521
weighted_std  =  0.0782261395385
