-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.30094339574
cusum  =  0.0862858655852
eta  =  0.678032493129
hl_amp_ratio  =  0.716939323568
kurtosis  =  -0.918085102896
n_points  =  263
period  =  0.736883642353
period_SNR  =  28.6014651131
period_log10FAP  =  -28.3356238379
period_uncertainty  =  0.000175462421811
phase_cusum  =  0.2548739638
phase_eta  =  0.459982027032
phi21  =  0.962138476456
phi31  =  1.9725496268
quartile31  =  0.48
r21  =  0.381700174186
r31  =  0.160222547374
shapiro_w  =  0.967304229736
skewness  =  -0.193219527102
slope_per10  =  -0.174117424167
slope_per90  =  0.192878913878
stetson_k  =  0.81782910677
weighted_mean  =  14.6733353199
weighted_std  =  0.285836483454
