-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.261162774646
cusum  =  0.142435586862
eta  =  0.75113306024
hl_amp_ratio  =  0.581977947273
kurtosis  =  -0.913462542932
n_points  =  239
period  =  0.555496474558
period_SNR  =  25.5063036519
period_log10FAP  =  -23.7270212034
period_uncertainty  =  0.000118176375687
phase_cusum  =  0.229493921992
phase_eta  =  0.392366777535
phi21  =  -1.95947586358
phi31  =  -0.731716196443
quartile31  =  0.375
r21  =  0.495155820414
r31  =  0.307411855543
shapiro_w  =  0.955160439014
skewness  =  -0.354641899655
slope_per10  =  -0.120314535604
slope_per90  =  0.32205647277
stetson_k  =  0.822256791564
weighted_mean  =  15.5342249123
weighted_std  =  0.215767089294
