-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.243920953931
cusum  =  0.0927668419514
eta  =  0.558502163516
hl_amp_ratio  =  0.49852487981
kurtosis  =  -0.963512648249
n_points  =  399
period  =  0.680347879502
period_SNR  =  46.1675362725
period_log10FAP  =  -56.7947591375
period_uncertainty  =  0.000129235601981
phase_cusum  =  0.251550646159
phase_eta  =  0.223234860676
phi21  =  -2.33367004957
phi31  =  -4.19221790194
quartile31  =  0.365
r21  =  0.381470503556
r31  =  0.213241567821
shapiro_w  =  0.938686490059
skewness  =  -0.453776244167
slope_per10  =  -0.132400002331
slope_per90  =  0.144565934459
stetson_k  =  0.803955201976
weighted_mean  =  16.6899262933
weighted_std  =  0.220076272566
