-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.19749736862
cusum  =  0.113538570675
eta  =  0.835692003887
hl_amp_ratio  =  0.909423773147
kurtosis  =  -0.796558919776
n_points  =  409
period  =  0.664495309439
period_SNR  =  51.9642432814
period_log10FAP  =  -50.1182605368
period_uncertainty  =  0.000123282992838
phase_cusum  =  0.226545381658
phase_eta  =  0.541564264902
phi21  =  1.17690589118
phi31  =  -0.822282969031
quartile31  =  0.27
r21  =  0.388753256067
r31  =  0.196562776725
shapiro_w  =  0.977286338806
skewness  =  -0.249650182569
slope_per10  =  -0.112507806142
slope_per90  =  0.0996200915357
stetson_k  =  0.825583685856
weighted_mean  =  17.4631348944
weighted_std  =  0.162542077009
