-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.265726425634
cusum  =  0.157721383442
eta  =  0.773399007433
hl_amp_ratio  =  0.716401307945
kurtosis  =  -1.03647844613
n_points  =  411
period  =  0.646047906577
period_SNR  =  46.9763377942
period_log10FAP  =  -45.0447590926
period_uncertainty  =  0.000138855409748
phase_cusum  =  0.269436846527
phase_eta  =  0.42988775481
phi21  =  -2.32073394776
phi31  =  -4.18894593029
quartile31  =  0.46
r21  =  0.414329137537
r31  =  0.359365203877
shapiro_w  =  0.965971767902
skewness  =  -0.140378407931
slope_per10  =  -0.0737287911654
slope_per90  =  0.0458009703838
stetson_k  =  0.823051121626
weighted_mean  =  18.2871630909
weighted_std  =  0.261671956581
