-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.318056944731
cusum  =  0.0963326738592
eta  =  0.542420917686
hl_amp_ratio  =  0.458461244771
kurtosis  =  -0.28865171436
n_points  =  380
period  =  0.617228051145
period_SNR  =  41.6093118925
period_log10FAP  =  -44.3951282935
period_uncertainty  =  0.00010608209622
phase_cusum  =  0.257575164382
phase_eta  =  0.260955396824
phi21  =  0.831617943238
phi31  =  2.06700392425
quartile31  =  0.3325
r21  =  0.505235401315
r31  =  0.230205395704
shapiro_w  =  0.939003884792
skewness  =  -0.703389858639
slope_per10  =  -0.120036561833
slope_per90  =  0.289259732421
stetson_k  =  0.760737320725
weighted_mean  =  13.6095147772
weighted_std  =  0.23310855183
