-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.35


######### Lightcurve features #########

amplitude  =  0.142269376255
cusum  =  0.167244086947
eta  =  0.580194352967
hl_amp_ratio  =  1.21515856382
kurtosis  =  -0.745716249531
n_points  =  199
period  =  0.218637624857
period_SNR  =  12.4930689896
period_log10FAP  =  -9.87617257882
period_uncertainty  =  1.27506313317e-05
phase_cusum  =  0.205302117922
phase_eta  =  1.29435578883
phi21  =  2.58285142025
phi31  =  2.07986135219
quartile31  =  0.29
r21  =  0.123469832372
r31  =  0.416805078612
shapiro_w  =  0.97791415453
skewness  =  0.0815813085182
slope_per10  =  -0.0681675982761
slope_per90  =  0.0310474412405
stetson_k  =  0.84892374673
weighted_mean  =  11.4953266332
weighted_std  =  0.167589378671
