-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.35


######### Lightcurve features #########

amplitude  =  0.235505792846
cusum  =  0.241110837425
eta  =  1.18836260534
hl_amp_ratio  =  0.479236924937
kurtosis  =  -0.945108263998
n_points  =  408
period  =  1.02076797962
period_SNR  =  14.409679828
period_log10FAP  =  -5.85423352177
period_uncertainty  =  0.000358667640775
phase_cusum  =  0.185460334542
phase_eta  =  1.47423884177
phi21  =  0.560905252427
phi31  =  0.962901149107
quartile31  =  0.67
r21  =  0.442256502359
r31  =  0.356824464427
shapiro_w  =  0.956653475761
skewness  =  -0.114686001843
slope_per10  =  -0.031961378633
slope_per90  =  0.0289836082594
stetson_k  =  0.78350869107
weighted_mean  =  15.4848301436
weighted_std  =  0.455471083818
