-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.24547267606
cusum  =  0.236485694622
eta  =  0.59495387368
hl_amp_ratio  =  0.361161384268
kurtosis  =  -0.886671991679
n_points  =  91
period  =  0.806357913159
period_SNR  =  11.3994098696
period_log10FAP  =  -9.38682387626
period_uncertainty  =  0.000190718532748
phase_cusum  =  0.441583961667
phase_eta  =  0.116353975999
phi21  =  1.09504571022
phi31  =  -0.584717230609
quartile31  =  0.28
r21  =  0.470687535358
r31  =  0.161316244706
shapiro_w  =  0.935170531273
skewness  =  -0.408479588728
slope_per10  =  -0.438100015745
slope_per90  =  0.470177710699
stetson_k  =  0.784626970111
weighted_mean  =  13.5493394495
weighted_std  =  0.178484765119
