-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.172220086293
cusum  =  0.0914452012051
eta  =  0.618738034991
hl_amp_ratio  =  0.682268067578
kurtosis  =  -0.41767844955
n_points  =  381
period  =  0.68361207667
period_SNR  =  40.0140441745
period_log10FAP  =  -40.6989235964
period_uncertainty  =  0.000124783166351
phase_cusum  =  0.234809250488
phase_eta  =  0.697724145599
phi21  =  -2.4094154052
phi31  =  -4.32151139114
quartile31  =  0.23
r21  =  0.39477114705
r31  =  0.199326467548
shapiro_w  =  0.979134321213
skewness  =  -0.350874341325
slope_per10  =  -0.119007715083
slope_per90  =  0.123508762822
stetson_k  =  0.792092010144
weighted_mean  =  16.2099675605
weighted_std  =  0.170984364959
