-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.30183258377
cusum  =  0.112149346287
eta  =  0.64550621
hl_amp_ratio  =  0.627233813157
kurtosis  =  -1.00194617259
n_points  =  372
period  =  0.621087443023
period_SNR  =  44.9860217431
period_log10FAP  =  -50.7547791455
period_uncertainty  =  0.000103480083234
phase_cusum  =  0.287592100757
phase_eta  =  0.182363065488
phi21  =  4.26194475818
phi31  =  5.61872394036
quartile31  =  0.44
r21  =  0.475715301826
r31  =  0.259751870446
shapiro_w  =  0.944209575653
skewness  =  -0.3860344423
slope_per10  =  -0.114530966369
slope_per90  =  0.328151248575
stetson_k  =  0.843126726718
weighted_mean  =  13.4197385831
weighted_std  =  0.266010633029
