-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.6


######### Lightcurve features #########

amplitude  =  0.370460500403
cusum  =  0.204498919748
eta  =  0.486910666344
hl_amp_ratio  =  0.453667373174
kurtosis  =  -1.27268787939
n_points  =  156
period  =  0.607836861786
period_SNR  =  19.9211308561
period_log10FAP  =  -19.4338530617
period_uncertainty  =  0.00010038925773
phase_cusum  =  0.29291281195
phase_eta  =  0.226042313398
phi21  =  -2.43969889042
phi31  =  -3.19436997604
quartile31  =  0.5825
r21  =  0.346642868728
r31  =  0.0574445629596
shapiro_w  =  0.896266341209
skewness  =  -0.426369374953
slope_per10  =  -0.260999985039
slope_per90  =  0.481072439765
stetson_k  =  0.826975276506
weighted_mean  =  13.9802976847
weighted_std  =  0.314110668819
