-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.191605653659
cusum  =  0.184843979041
eta  =  1.32626714638
hl_amp_ratio  =  0.744720793968
kurtosis  =  0.231496492622
n_points  =  311
period  =  0.648976618208
period_SNR  =  20.7246961276
period_log10FAP  =  -12.0021694315
period_uncertainty  =  0.000116772822509
phase_cusum  =  0.228394943342
phase_eta  =  1.27418276817
phi21  =  -2.39032312031
phi31  =  -0.790326135592
quartile31  =  0.32
r21  =  0.548554103467
r31  =  0.383528068632
shapiro_w  =  0.989737570286
skewness  =  -0.060214894591
slope_per10  =  -0.063719787207
slope_per90  =  0.0791914252928
stetson_k  =  0.756515539344
weighted_mean  =  18.2426071826
weighted_std  =  0.23531979349
