-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.18389398479
cusum  =  0.179963998432
eta  =  0.467606666268
hl_amp_ratio  =  0.632905935319
kurtosis  =  -1.00926127521
n_points  =  418
period  =  0.614440592805
period_SNR  =  53.1324429507
period_log10FAP  =  -58.939989686
period_uncertainty  =  0.000104660456824
phase_cusum  =  0.342139827075
phase_eta  =  0.257551465137
phi21  =  -2.09215818814
phi31  =  -0.671747309567
quartile31  =  0.2375
r21  =  0.401034902879
r31  =  0.259788000915
shapiro_w  =  0.952535390854
skewness  =  -0.332916705437
slope_per10  =  -0.171633335607
slope_per90  =  0.181279882672
stetson_k  =  0.824361227769
weighted_mean  =  15.8850898323
weighted_std  =  0.144105846974
