-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.141029272068
cusum  =  0.184594373685
eta  =  1.17506313598
hl_amp_ratio  =  0.912726233068
kurtosis  =  -0.967566512664
n_points  =  152
period  =  0.782228309343
period_SNR  =  23.0323307346
period_log10FAP  =  -12.6903806629
period_uncertainty  =  0.000170583641194
phase_cusum  =  0.306261674414
phase_eta  =  0.753485195776
phi21  =  -1.4839581414
phi31  =  -2.81190750873
quartile31  =  0.2325
r21  =  0.448797449348
r31  =  0.196630499162
shapiro_w  =  0.972302138805
skewness  =  -0.0382796110982
slope_per10  =  -0.267937220857
slope_per90  =  0.371499990579
stetson_k  =  0.872322019842
weighted_mean  =  16.9851805013
weighted_std  =  0.139606609105
