-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.30208158951
cusum  =  0.111695393143
eta  =  0.51130207934
hl_amp_ratio  =  0.366582979823
kurtosis  =  -0.912427996924
n_points  =  396
period  =  0.609251875549
period_SNR  =  46.5120356789
period_log10FAP  =  -52.8967706396
period_uncertainty  =  0.000102900265544
phase_cusum  =  0.252808679505
phase_eta  =  0.172855909016
phi21  =  4.12502518655
phi31  =  5.53500770454
quartile31  =  0.41
r21  =  0.515522184991
r31  =  0.304323512174
shapiro_w  =  0.910343825817
skewness  =  -0.603294120063
slope_per10  =  -0.102688900964
slope_per90  =  0.195806188505
stetson_k  =  0.7460732097
weighted_mean  =  15.0142286971
weighted_std  =  0.266088518732
