-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.349284197673
cusum  =  0.173477715945
eta  =  0.635294372668
hl_amp_ratio  =  0.399054135199
kurtosis  =  -0.464903434359
n_points  =  314
period  =  0.597786607731
period_SNR  =  40.4235615683
period_log10FAP  =  -37.3120307098
period_uncertainty  =  0.000106969190843
phase_cusum  =  0.267580064297
phase_eta  =  0.285529141685
phi21  =  0.770032393963
phi31  =  1.70727102299
quartile31  =  0.49
r21  =  0.488023874549
r31  =  0.260859367287
shapiro_w  =  0.905673027039
skewness  =  -0.718681501659
slope_per10  =  -0.133790692157
slope_per90  =  0.241161832039
stetson_k  =  0.751370127162
weighted_mean  =  13.3330197445
weighted_std  =  0.332070981358
