-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.300736197561
cusum  =  0.151903377459
eta  =  0.614449616916
hl_amp_ratio  =  0.401677089275
kurtosis  =  -0.814684061123
n_points  =  268
period  =  0.641361051705
period_SNR  =  37.2539551176
period_log10FAP  =  -31.3191841887
period_uncertainty  =  0.000117603247837
phase_cusum  =  0.282478093797
phase_eta  =  0.194965249223
phi21  =  4.13863284799
phi31  =  5.46524466779
quartile31  =  0.43
r21  =  0.47018224162
r31  =  0.358728625403
shapiro_w  =  0.93420445919
skewness  =  -0.53560524989
slope_per10  =  -0.151683843855
slope_per90  =  0.16304054832
stetson_k  =  0.761243306416
weighted_mean  =  15.0188553085
weighted_std  =  0.270200490542
