-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.207922775724
cusum  =  0.145466781039
eta  =  1.24218351782
hl_amp_ratio  =  0.935962499167
kurtosis  =  -0.0301479994083
n_points  =  389
period  =  0.683923676905
period_SNR  =  35.2775836642
period_log10FAP  =  -23.6292663962
period_uncertainty  =  0.000155614041482
phase_cusum  =  0.196931367627
phase_eta  =  1.21838379376
phi21  =  -2.34673324441
phi31  =  -1.54173805282
quartile31  =  0.39
r21  =  0.551548270673
r31  =  0.196222600672
shapiro_w  =  0.997814893723
skewness  =  0.112225623322
slope_per10  =  -0.0506587336383
slope_per90  =  0.0422799328622
stetson_k  =  0.79261847569
weighted_mean  =  19.0821833751
weighted_std  =  0.275699385115
