-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.244787176819
cusum  =  0.178213107114
eta  =  0.545518173261
hl_amp_ratio  =  0.333033017217
kurtosis  =  -0.123044091627
n_points  =  266
period  =  0.702519114717
period_SNR  =  36.9124377038
period_log10FAP  =  -31.0209173207
period_uncertainty  =  0.000141079432468
phase_cusum  =  0.268996450424
phase_eta  =  0.0760840107724
phi21  =  -2.12441831841
phi31  =  -4.18218258676
quartile31  =  0.2575
r21  =  0.502297193864
r31  =  0.38314459486
shapiro_w  =  0.896157503128
skewness  =  -0.92808338465
slope_per10  =  -0.290428724067
slope_per90  =  0.24361188116
stetson_k  =  0.699304701524
weighted_mean  =  14.7170916197
weighted_std  =  0.216562918528
