-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.306673051679
cusum  =  0.187333218166
eta  =  0.534183969692
hl_amp_ratio  =  0.681090085359
kurtosis  =  -0.739979744574
n_points  =  182
period  =  0.621581072867
period_SNR  =  20.9344897191
period_log10FAP  =  -15.7337283257
period_uncertainty  =  0.000113792672244
phase_cusum  =  0.333805706778
phase_eta  =  0.169231677751
phi21  =  1.01265969187
phi31  =  -0.787533470363
quartile31  =  0.3875
r21  =  0.561758414616
r31  =  0.385744922672
shapiro_w  =  0.963897228241
skewness  =  -0.340248139255
slope_per10  =  -0.236175237184
slope_per90  =  0.509510448195
stetson_k  =  0.813267565375
weighted_mean  =  13.8591084528
weighted_std  =  0.27727206534
