-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.245227577713
cusum  =  0.209502785165
eta  =  0.600450855078
hl_amp_ratio  =  0.479024413817
kurtosis  =  -0.986336356002
n_points  =  150
period  =  0.718515853164
period_SNR  =  19.4753255187
period_log10FAP  =  -18.4620699076
period_uncertainty  =  0.000112119196483
phase_cusum  =  0.329981039925
phase_eta  =  0.181372663714
phi21  =  4.35420494297
phi31  =  5.93819368475
quartile31  =  0.36
r21  =  0.490890250298
r31  =  0.31045063523
shapiro_w  =  0.923664927483
skewness  =  -0.492848353218
slope_per10  =  -0.396302759357
slope_per90  =  0.402788851483
stetson_k  =  0.760927847428
weighted_mean  =  16.2110447344
weighted_std  =  0.226155104453
