-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.222002720662
cusum  =  0.108713162566
eta  =  0.421184387571
hl_amp_ratio  =  0.754629972831
kurtosis  =  -1.11134524616
n_points  =  417
period  =  0.750586381151
period_SNR  =  52.2457957482
period_log10FAP  =  -61.9285438656
period_uncertainty  =  0.000180762565148
phase_cusum  =  0.273796215434
phase_eta  =  0.0538286558681
phi21  =  1.38546673788
phi31  =  -0.0385202015187
quartile31  =  0.28
r21  =  0.443682028
r31  =  0.22569151457
shapiro_w  =  0.957010269165
skewness  =  -0.0914020870623
slope_per10  =  -0.237793263884
slope_per90  =  0.458294001772
stetson_k  =  0.857480667972
weighted_mean  =  13.8740417813
weighted_std  =  0.17527065987
