-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.115904649034
cusum  =  0.127582895922
eta  =  0.48901097779
hl_amp_ratio  =  0.660392347092
kurtosis  =  -0.593150141631
n_points  =  387
period  =  0.166851015296
period_SNR  =  14.3107193682
period_log10FAP  =  -11.5849921731
period_uncertainty  =  8.92378676676e-06
phase_cusum  =  0.173448544764
phase_eta  =  1.56080593575
phi21  =  -1.50403230855
phi31  =  -4.86356507253
quartile31  =  0.295
r21  =  0.302384327901
r31  =  0.343425117584
shapiro_w  =  0.972073495388
skewness  =  -0.406390685207
slope_per10  =  -0.0116323970529
slope_per90  =  0.0125790218754
stetson_k  =  0.798847156954
weighted_mean  =  14.9635921364
weighted_std  =  0.187195564313
