-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.184814817998
cusum  =  0.108975709113
eta  =  0.479177649803
hl_amp_ratio  =  0.89074715699
kurtosis  =  -1.15558432129
n_points  =  378
period  =  0.611301859762
period_SNR  =  50.6473638874
period_log10FAP  =  -58.3293849327
period_uncertainty  =  0.0001205168989
phase_cusum  =  0.254886372013
phase_eta  =  0.176987229766
phi21  =  1.07478920579
phi31  =  2.60539115347
quartile31  =  0.25
r21  =  0.408280681784
r31  =  0.148830091398
shapiro_w  =  0.957491695881
skewness  =  -0.0997699977751
slope_per10  =  -0.226022009844
slope_per90  =  0.357789981101
stetson_k  =  0.879247947086
weighted_mean  =  13.5021276596
weighted_std  =  0.145553156241
