-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.141280203506
cusum  =  0.118544352518
eta  =  1.10360342646
hl_amp_ratio  =  0.945259651717
kurtosis  =  0.600435607174
n_points  =  327
period  =  0.635676127567
period_SNR  =  44.9140319224
period_log10FAP  =  -27.32104533
period_uncertainty  =  0.000114544498231
phase_cusum  =  0.227892139119
phase_eta  =  0.932628730997
phi21  =  0.967958295621
phi31  =  -0.332640302493
quartile31  =  0.22
r21  =  0.36850239022
r31  =  0.187000527165
shapiro_w  =  0.97924131155
skewness  =  -0.21382507533
slope_per10  =  -0.173232754464
slope_per90  =  0.242610029846
stetson_k  =  0.807771788871
weighted_mean  =  14.1464379331
weighted_std  =  0.152667492284
