-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.310826581372
cusum  =  0.0728160540831
eta  =  0.561228033958
hl_amp_ratio  =  0.578464843025
kurtosis  =  -0.41744445545
n_points  =  420
period  =  0.579265245645
period_SNR  =  49.913594044
period_log10FAP  =  -53.448395901
period_uncertainty  =  0.000108898094896
phase_cusum  =  0.222540713042
phase_eta  =  0.418341277261
phi21  =  1.05223630323
phi31  =  1.46575610565
quartile31  =  0.4
r21  =  0.332800861227
r31  =  0.145093187333
shapiro_w  =  0.934532999992
skewness  =  -0.691863826369
slope_per10  =  -0.0752882884291
slope_per90  =  0.0513595454613
stetson_k  =  0.807740869855
weighted_mean  =  12.5116904762
weighted_std  =  0.272687243498
