-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.31046773514
cusum  =  0.188969328295
eta  =  0.488463702935
hl_amp_ratio  =  0.731408511965
kurtosis  =  -0.826486893783
n_points  =  374
period  =  0.609718279456
period_SNR  =  43.2910805855
period_log10FAP  =  -46.1964513712
period_uncertainty  =  0.000101174547918
phase_cusum  =  0.244274460348
phase_eta  =  0.347456340625
phi21  =  0.770123482094
phi31  =  2.3539823713
quartile31  =  0.44
r21  =  0.353178735877
r31  =  0.222986247019
shapiro_w  =  0.938716411591
skewness  =  -0.477458734562
slope_per10  =  -0.0837551564708
slope_per90  =  0.224712727923
stetson_k  =  0.842337902363
weighted_mean  =  14.3056849631
weighted_std  =  0.27563349715
