-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.46


######### Lightcurve features #########

amplitude  =  0.380957637179
cusum  =  0.200764654926
eta  =  0.608638437766
hl_amp_ratio  =  0.66649038718
kurtosis  =  -0.61656414979
n_points  =  63
period  =  0.109633673195
period_SNR  =  8.13534340563
period_log10FAP  =  -4.04598275352
period_uncertainty  =  4.01617969543e-06
phase_cusum  =  0.291677268054
phase_eta  =  0.839551444193
phi21  =  -4.31736336382
phi31  =  -4.90799261384
quartile31  =  0.495
r21  =  0.166692485071
r31  =  0.0932404855002
shapiro_w  =  0.941030025482
skewness  =  -0.50327879422
slope_per10  =  -0.0157886708537
slope_per90  =  0.113901392802
stetson_k  =  0.796082591884
weighted_mean  =  15.4604983923
weighted_std  =  0.319418798709
