-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.275266223751
cusum  =  0.124390961604
eta  =  0.681656856237
hl_amp_ratio  =  0.582409120926
kurtosis  =  -0.486447763214
n_points  =  319
period  =  0.610337631178
period_SNR  =  41.6077273248
period_log10FAP  =  -35.2909893459
period_uncertainty  =  0.000147904300458
phase_cusum  =  0.243461036669
phase_eta  =  0.162086994706
phi21  =  1.06264114495
phi31  =  -0.912298128974
quartile31  =  0.3
r21  =  0.579132070797
r31  =  0.358511282154
shapiro_w  =  0.944194614887
skewness  =  -0.624811365179
slope_per10  =  -0.166468985585
slope_per90  =  0.191658787281
stetson_k  =  0.751354528385
weighted_mean  =  15.5690344493
weighted_std  =  0.233072680394
