-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.77


######### Lightcurve features #########

amplitude  =  0.247270608228
cusum  =  0.166156697283
eta  =  0.544449315131
hl_amp_ratio  =  0.180795540277
kurtosis  =  0.314772107976
n_points  =  156
period  =  0.500270596117
period_SNR  =  18.7574948925
period_log10FAP  =  -14.8658600677
period_uncertainty  =  7.16145507844e-05
phase_cusum  =  0.214619067324
phase_eta  =  0.282095889656
phi21  =  0.44464006246
phi31  =  2.33074340365
quartile31  =  0.21
r21  =  0.200510311825
r31  =  0.0741338819548
shapiro_w  =  0.818228781223
skewness  =  -1.19192527817
slope_per10  =  -0.257137270611
slope_per90  =  0.338780644045
stetson_k  =  0.652545573273
weighted_mean  =  14.8455769231
weighted_std  =  0.169868879994
