-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.165744562772
cusum  =  0.0838092934188
eta  =  0.49198282944
hl_amp_ratio  =  0.791625524435
kurtosis  =  -1.11444636443
n_points  =  371
period  =  0.682321042936
period_SNR  =  46.1573858271
period_log10FAP  =  -49.059163105
period_uncertainty  =  0.000126703012985
phase_cusum  =  0.233569918335
phase_eta  =  0.367518892285
phi21  =  1.02911866327
phi31  =  2.39576232346
quartile31  =  0.23
r21  =  0.409019847189
r31  =  0.221222811594
shapiro_w  =  0.948102712631
skewness  =  -0.28122485658
slope_per10  =  -0.233758168415
slope_per90  =  0.240287500257
stetson_k  =  0.872404144966
weighted_mean  =  13.3482957619
weighted_std  =  0.139026237996
