-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.321867519169
cusum  =  0.140541961309
eta  =  0.527184296631
hl_amp_ratio  =  0.34443899975
kurtosis  =  -0.771138407755
n_points  =  394
period  =  0.616910840726
period_SNR  =  48.0163695678
period_log10FAP  =  -51.0056509174
period_uncertainty  =  0.000128273676337
phase_cusum  =  0.290360603417
phase_eta  =  0.0942178756486
phi21  =  -2.13133250749
phi31  =  -4.05677085154
quartile31  =  0.44
r21  =  0.4960263653
r31  =  0.318831358225
shapiro_w  =  0.912330210209
skewness  =  -0.66515281854
slope_per10  =  -0.108523894657
slope_per90  =  0.130609084222
stetson_k  =  0.720355242208
weighted_mean  =  15.5154184597
weighted_std  =  0.296136261901
