-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.2497244304
cusum  =  0.331134386917
eta  =  0.424184324997
hl_amp_ratio  =  0.846853623276
kurtosis  =  -0.396836432162
n_points  =  360
period  =  0.631273884158
period_SNR  =  29.250958936
period_log10FAP  =  -26.1743128741
period_uncertainty  =  0.000111061559275
phase_cusum  =  0.243634167963
phase_eta  =  0.991153432369
phi21  =  0.901139010114
phi31  =  2.38569046723
quartile31  =  0.405
r21  =  0.330842294057
r31  =  0.310126092257
shapiro_w  =  0.979364991188
skewness  =  -0.365803551728
slope_per10  =  -0.0641947335651
slope_per90  =  0.0591166349923
stetson_k  =  0.802686290879
weighted_mean  =  15.1838302714
weighted_std  =  0.275711402112
