-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.069592101535
cusum  =  0.244883441688
eta  =  0.624205870038
hl_amp_ratio  =  3.40131820288
kurtosis  =  7.61859954354
n_points  =  66
period  =  0.669725800377
period_SNR  =  7.36497557936
period_log10FAP  =  -0.50551444886
period_uncertainty  =  0.000105104491034
phase_cusum  =  0.210761938007
phase_eta  =  0.904573758822
phi21  =  -2.89022183031
phi31  =  -3.43959270935
quartile31  =  0.03
r21  =  0.403394670631
r31  =  0.420228338987
shapiro_w  =  0.698230922222
skewness  =  2.56886533432
slope_per10  =  -0.86959999986
slope_per90  =  0.66909999121
stetson_k  =  0.576255816796
weighted_mean  =  14.0541581633
weighted_std  =  0.0554830870046
