-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.324866424331
cusum  =  0.1354127131
eta  =  0.546381360255
hl_amp_ratio  =  0.864462620214
kurtosis  =  -1.15140859831
n_points  =  326
period  =  0.755376690647
period_SNR  =  39.8624860483
period_log10FAP  =  -43.845591204
period_uncertainty  =  0.000159820735256
phase_cusum  =  0.270062867762
phase_eta  =  0.111209858708
phi21  =  -1.94994430472
phi31  =  -0.336092136753
quartile31  =  0.5
r21  =  0.481088306869
r31  =  0.268546162819
shapiro_w  =  0.948898732662
skewness  =  -0.0666751448236
slope_per10  =  -0.196920850296
slope_per90  =  0.286528776405
stetson_k  =  0.832715281307
weighted_mean  =  14.7070278836
weighted_std  =  0.283928567957
