-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.239448216275
cusum  =  0.146475122867
eta  =  0.556159213957
hl_amp_ratio  =  0.528563451984
kurtosis  =  -0.721702390925
n_points  =  314
period  =  0.539530579012
period_SNR  =  42.8057856944
period_log10FAP  =  -47.4164438436
period_uncertainty  =  0.000109673429142
phase_cusum  =  0.27277717008
phase_eta  =  0.15471278982
phi21  =  0.965364462889
phi31  =  2.28823322577
quartile31  =  0.3375
r21  =  0.39829860666
r31  =  0.264448158961
shapiro_w  =  0.946522653103
skewness  =  -0.430762589625
slope_per10  =  -0.160105222115
slope_per90  =  0.222042486138
stetson_k  =  0.822145271464
weighted_mean  =  13.4346304929
weighted_std  =  0.198195053439
