-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.186876547667
cusum  =  0.0954218720025
eta  =  0.585875500991
hl_amp_ratio  =  0.7543365899
kurtosis  =  -1.1182944495
n_points  =  424
period  =  0.635798592411
period_SNR  =  49.5278963401
period_log10FAP  =  -55.2630581478
period_uncertainty  =  0.000108092249244
phase_cusum  =  0.207417983214
phase_eta  =  0.365580699095
phi21  =  -1.87915556825
phi31  =  -3.45097083722
quartile31  =  0.27
r21  =  0.457681904178
r31  =  0.207802152249
shapiro_w  =  0.94819766283
skewness  =  -0.258382718368
slope_per10  =  -0.164521742308
slope_per90  =  0.197580289756
stetson_k  =  0.841193469577
weighted_mean  =  14.6908946417
weighted_std  =  0.162107963448
