-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.239857877281
cusum  =  0.241947107975
eta  =  0.804830493663
hl_amp_ratio  =  0.60165749529
kurtosis  =  -1.15766271567
n_points  =  47
period  =  0.61625924677
period_SNR  =  9.60682858014
period_log10FAP  =  -3.38099092673
period_uncertainty  =  0.000125194878755
phase_cusum  =  0.402766980938
phase_eta  =  0.27580456817
phi21  =  0.772514140559
phi31  =  1.12326410008
quartile31  =  0.35
r21  =  0.360472640337
r31  =  0.102096696665
shapiro_w  =  0.941083788872
skewness  =  -0.257798905211
slope_per10  =  -0.523799993098
slope_per90  =  0.345552194668
stetson_k  =  0.817208105367
weighted_mean  =  15.7417008024
weighted_std  =  0.20510155734
