-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  0.149754852923
cusum  =  0.116668738523
eta  =  0.460963112461
hl_amp_ratio  =  1.03277413622
kurtosis  =  -0.14927176397
n_points  =  215
period  =  0.413228337648
period_SNR  =  21.2609651316
period_log10FAP  =  -19.9615746458
period_uncertainty  =  4.61130588078e-05
phase_cusum  =  0.24047467747
phase_eta  =  0.743170199618
phi21  =  -1.37703583396
phi31  =  -2.59969276207
quartile31  =  0.18
r21  =  0.2860399736
r31  =  0.151604954035
shapiro_w  =  0.992180466652
skewness  =  0.0693533047262
slope_per10  =  -0.101399571
slope_per90  =  0.108299490503
stetson_k  =  0.786539469905
weighted_mean  =  12.8703965785
weighted_std  =  0.134769827814
