-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.189810448914
cusum  =  0.118878766667
eta  =  0.591633265218
hl_amp_ratio  =  0.552407239318
kurtosis  =  -0.196255668174
n_points  =  227
period  =  0.554209270865
period_SNR  =  19.6679772083
period_log10FAP  =  -17.1621847508
period_uncertainty  =  0.00010018848249
phase_cusum  =  0.235113267902
phase_eta  =  0.644660631648
phi21  =  -1.70521595939
phi31  =  -0.0854612225203
quartile31  =  0.295
r21  =  0.302602185874
r31  =  0.259784418594
shapiro_w  =  0.940373301506
skewness  =  -0.692198267934
slope_per10  =  -0.119651291695
slope_per90  =  0.375200007111
stetson_k  =  0.779465789012
weighted_mean  =  14.5714060576
weighted_std  =  0.199170649572
