-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.63


######### Lightcurve features #########

amplitude  =  0.066630811786
cusum  =  0.140496798271
eta  =  1.93119060916
hl_amp_ratio  =  1.05809918127
kurtosis  =  0.203934726907
n_points  =  277
period  =  0.191056815336
period_SNR  =  10.9082420724
period_log10FAP  =  -0.523761292202
period_uncertainty  =  1.03819427412e-05
phase_cusum  =  0.134041858603
phase_eta  =  1.88826699525
phi21  =  -1.0435160921
phi31  =  -0.723055028545
quartile31  =  0.19
r21  =  0.30398984856
r31  =  0.217200908133
shapiro_w  =  0.993571639061
skewness  =  -0.0383411501129
slope_per10  =  -0.0227945998911
slope_per90  =  0.0254511716937
stetson_k  =  0.792237118036
weighted_mean  =  18.4687317243
weighted_std  =  0.143012509074
