-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.174859821114
cusum  =  0.151465991096
eta  =  0.567221471163
hl_amp_ratio  =  0.756373805037
kurtosis  =  -0.841663246633
n_points  =  297
period  =  0.618027882528
period_SNR  =  47.2074891127
period_log10FAP  =  -41.2040086017
period_uncertainty  =  0.000197242959094
phase_cusum  =  0.274124076354
phase_eta  =  0.17918465855
phi21  =  0.8928435945
phi31  =  2.42401345159
quartile31  =  0.23
r21  =  0.430823542322
r31  =  0.265259244514
shapiro_w  =  0.960122168064
skewness  =  -0.380349888929
slope_per10  =  -0.267900016624
slope_per90  =  0.245172047989
stetson_k  =  0.844817282178
weighted_mean  =  15.4833476912
weighted_std  =  0.145575030028
