-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.356584356465
cusum  =  0.0821475672413
eta  =  0.700214369088
hl_amp_ratio  =  0.40668421689
kurtosis  =  -0.364865352688
n_points  =  297
period  =  0.556663411923
period_SNR  =  42.592023071
period_log10FAP  =  -35.4711313134
period_uncertainty  =  0.000106701827176
phase_cusum  =  0.237251989203
phase_eta  =  0.24223361457
phi21  =  0.789080206718
phi31  =  -1.21427063185
quartile31  =  0.47
r21  =  0.519072087806
r31  =  0.347187402012
shapiro_w  =  0.909510970116
skewness  =  -0.823986634367
slope_per10  =  -0.100655695312
slope_per90  =  0.206562111391
stetson_k  =  0.727869550189
weighted_mean  =  14.6448316764
weighted_std  =  0.33660603409
