-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.281469836721
cusum  =  0.119673044148
eta  =  0.526157967236
hl_amp_ratio  =  0.374518435295
kurtosis  =  -0.382681657187
n_points  =  280
period  =  0.52495533249
period_SNR  =  38.1821786084
period_log10FAP  =  -33.9524072502
period_uncertainty  =  0.00012646479428
phase_cusum  =  0.273803794794
phase_eta  =  0.110115859924
phi21  =  4.00515064997
phi31  =  5.09660241431
quartile31  =  0.34
r21  =  0.501187245352
r31  =  0.304250461639
shapiro_w  =  0.912922561169
skewness  =  -0.798569659881
slope_per10  =  -0.163043562417
slope_per90  =  0.231115458847
stetson_k  =  0.727006201434
weighted_mean  =  15.4946873162
weighted_std  =  0.233691575259
