-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.320887329307
cusum  =  0.103502744955
eta  =  0.622805805263
hl_amp_ratio  =  0.799310137968
kurtosis  =  -0.94574652128
n_points  =  286
period  =  0.628628770196
period_SNR  =  38.5190367904
period_log10FAP  =  -34.3134658561
period_uncertainty  =  0.000203997240264
phase_cusum  =  0.2477015375
phase_eta  =  0.178637626363
phi21  =  0.91159157646
phi31  =  2.10610588909
quartile31  =  0.4725
r21  =  0.504023343672
r31  =  0.386523385958
shapiro_w  =  0.940151274204
skewness  =  -0.432296597056
slope_per10  =  -0.14646405281
slope_per90  =  0.171840696821
stetson_k  =  0.828959750688
weighted_mean  =  15.8668352888
weighted_std  =  0.304488784525
