-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.392101479854
cusum  =  0.165043254422
eta  =  0.546868217276
hl_amp_ratio  =  0.417681305395
kurtosis  =  -1.17595794179
n_points  =  293
period  =  0.581911009885
period_SNR  =  41.2624825393
period_log10FAP  =  -35.4687001409
period_uncertainty  =  0.000116615437005
phase_cusum  =  0.237271451169
phase_eta  =  0.461142331625
phi21  =  0.896606336987
phi31  =  2.18773931989
quartile31  =  0.64
r21  =  0.401176419182
r31  =  0.231286128642
shapiro_w  =  0.906345963478
skewness  =  -0.460422246784
slope_per10  =  -0.12220939257
slope_per90  =  0.20547984653
stetson_k  =  0.799895590006
weighted_mean  =  14.5327451052
weighted_std  =  0.364984529814
