-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.305247173689
cusum  =  0.0911158849681
eta  =  0.977830319187
hl_amp_ratio  =  0.564144236214
kurtosis  =  -1.20262960316
n_points  =  466
period  =  0.552037275602
period_SNR  =  36.0277978422
period_log10FAP  =  -34.3683319363
period_uncertainty  =  0.000139694390773
phase_cusum  =  0.181345484672
phase_eta  =  0.901833647598
phi21  =  -2.30894117493
phi31  =  -0.917315978717
quartile31  =  0.685
r21  =  0.583146114752
r31  =  0.281616054463
shapiro_w  =  0.928755521774
skewness  =  -0.362109613814
slope_per10  =  -0.0342736507131
slope_per90  =  0.0357600420463
stetson_k  =  0.829214404185
weighted_mean  =  14.0415665974
weighted_std  =  0.382187804035
